-- +goose Up
-- +goose StatementBegin
ALTER TABLE device_state
    ADD COLUMN temperature INT NOT NULL DEFAULT 0;
-- +goose StatementEnd

-- +goose Down
-- +goose StatementBegin
ALTER TABLE device_state
    DROP COLUMN temperature;
-- +goose StatementEnd
